% CV: Andreas Bott
\documentclass[11pt,a4paper]{article}
\usepackage[T1]{fontenc}
\usepackage[utf8]{inputenc}
\usepackage[margin=25mm]{geometry}
\usepackage{hyperref}
\pagestyle{empty}
\setlength{\parindent}{0pt}
\begin{document}

{\LARGE\bfseries Andreas Bott}

\medskip

Phytec entwickelt und produziert Mikroprozessor Module und industrielle Serienprodukte.
Unser Leistungsspektrum ist Ihr Zeitvorteil


\medskip

a.bott@phytec.de \textbar{} +49 6131 9221-152 \textbar{} \url{https://vutuv.de/andreas_bott}

Robert-Koch-Straße 39, 55129 Mainz, Germany


\section*{Tags}
android \textbullet{} Embedded Imaging \textbullet{} internet of things \textbullet{} Linux BSP \textbullet{} NXP i.MX Applications Processors \textbullet{} Rockchip RK Processors \textbullet{} Single Board Computer \textbullet{} System on Module \textbullet{} TI Sitara Processors \textbullet{} Wärmebildkameras \textbullet{} windows \textbullet{} Yocto

\section*{Links}
Phytec Messtechnik GmbH: \url{http://www.phytec.de/}

Produkt des Jahres 2018 Embedded Design: \url{http://www.elektroniknet.de/elektronik/embedded/bilder/nominierte-zum-produkt-des-jahres-2018-7296-Bild-2.html?aid=148174&cp=1}

\end{document}
